2230 2240 2250 2260 2270 2280 2290 2300 2310 2320 2330 0

10

20

30

40

50

60

70

80

90

100

Transmission (%)

Wavelength (nm)

Filter #221, CO bandhead, vacuum wavelength, T=74K