4000 6000 8000 0

5

10

15

sp0946+139 sdF central narrow slit sp0644+375 DA central narrow slit sp2032+248 DA displaced wide slit sp1446+259 sdF displaced wide slit

wavelength

The displaced slit gives rise to a shift of the sampled wavelength regions. The narrow slit gives rise to slit losses.