4000 5000 6000 7000 8000 9000 0

2

4

6

8

Order 8 Order 10

Order 12

Order 14

O 16

O 18

Grism 9 + Grism 10 wide-slit system efficiency

sp2032+248 DA

sp2209+178 sdF

wavelength