Filen:o Object Exposure time Filter/grism Slit/mask/other Focus StartingtimeUTC Zenithdistance Seeing Remarks

Fileprefix: Date: Instrument:

Observer(s):

NOT Observing Log

NOT 13/02/2002 ˙ Nordic Optical Telescope is operated on the island of La Palma jointly by Denmark, Finland, Iceland, Norway, and Sweden, in the Spanish Observatorio del Roque de los Muchachos of the Instituto de Astrofísica de Canarias

Page: /